"Declination Calculator"
"D.C.H.1"
"Declination is the amount of offset that must be present at the top"
"pivot point of your dish's polar mount so that it will track the"
"satellite arc properly.  The closer you are to the equator, the smaller"
"the correction.  Conversely, the closer you are to the North or South"
"Poles, the larger the correction.  If declination is not considered in"
"a satellite dish installation, it is likely the reception will be"
"clear in the center of the arc and not at either end or vice versa."
"The calculator starts with a dish having a polar mount that is 4 feet"
"long and it uses the latitude for the current location.  All amounts"  
"are rounded to tenths except the correction.  Use the appropriate" 
"function keys to change polar mount length, or to use a different" 
"latitude.  The north or south for latitude is omitted because the"
"calculation is the same for both hemispheres."

